From b3b0fd552e11cb47cded66c42274acd710c8aee2 Mon Sep 17 00:00:00 2001
From: Wolfgang Denk <wd@pollux.denx.de>
Date: Fri, 12 Aug 2005 23:20:59 +0200
Subject: Fix Murray Jensen's mail address. Patch by Murray Jensen, 30 Jun 2005

---
 tools/bddb/create_tables.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'tools/bddb/create_tables.sql')

diff --git a/tools/bddb/create_tables.sql b/tools/bddb/create_tables.sql
index aa007c16c8b..4c25dd138e1 100644
--- a/tools/bddb/create_tables.sql
+++ b/tools/bddb/create_tables.sql
@@ -4,8 +4,8 @@
 # Host: localhost Database : hymod_bddb
 
 # (C) Copyright 2001
-# Murray Jensen <Murray.Jensen@cmst.csiro.au>
-# CSIRO Manufacturing Science and Technology, Preston Lab
+# Murray Jensen <Murray.Jensen@csiro.au>
+# CSIRO Manufacturing and Infrastructure Technology, Preston Lab
 
 # --------------------------------------------------------
 #
-- 
cgit v1.3.1


From d992daf99d1ce39ee18b353b67fdfa181d83fbff Mon Sep 17 00:00:00 2001
From: Wolfgang Denk <wd@pollux.denx.de>
Date: Fri, 12 Aug 2005 23:27:18 +0200
Subject: Update Hymod Board Database PHP code in "tools" directory Patch by
 Murray Jensen, 01 Jul 2005

---
 CHANGELOG                    |  3 ++
 tools/bddb/brlog.php         | 13 +++---
 tools/bddb/browse.php        | 53 ++++++++++++++++--------
 tools/bddb/create_tables.sql | 78 +++++++++++++++++------------------
 tools/bddb/defs.php          | 97 +++++++++++++++++++++++++++++++-------------
 tools/bddb/dodelete.php      |  3 +-
 tools/bddb/dodellog.php      |  6 ++-
 tools/bddb/doedit.php        | 56 ++++++++++++++++---------
 tools/bddb/doedlog.php       | 17 +++++---
 tools/bddb/donew.php         |  4 +-
 tools/bddb/donewlog.php      | 15 +++++--
 tools/bddb/edit.php          | 16 ++++----
 tools/bddb/edlog.php         |  6 ++-
 tools/bddb/execute.php       |  8 +---
 tools/bddb/new.php           | 17 ++++----
 tools/bddb/newlog.php        | 15 ++++---
 16 files changed, 252 insertions(+), 155 deletions(-)

(limited to 'tools/bddb/create_tables.sql')

diff --git a/CHANGELOG b/CHANGELOG
index 5860117f258..483135f94ea 100644
--- a/CHANGELOG
+++ b/CHANGELOG
@@ -2,6 +2,9 @@
 Changes for U-Boot 1.1.3:
 ======================================================================
 
+* Update Hymod Board Database PHP code in "tools" directory
+  Patch by Murray Jensen, 01 Jul 2005
+
 * Make "tr" command use POSIX compliant; export HOSTOS make variable
   Patch by Murray Jensen, 30 Jun 2005
 
diff --git a/tools/bddb/brlog.php b/tools/bddb/brlog.php
index e95d694a977..fccfbd011c2 100644
--- a/tools/bddb/brlog.php
+++ b/tools/bddb/brlog.php
@@ -10,8 +10,9 @@
 
 	pg_head("$bddb_label - Browse Board Log");
 
-	if (!isset($serno) || $serno == 0)
-		die("serial number not specified!");
+	$serno=intval($serno);
+	if ($serno == 0)
+		die("serial number not specified or invalid!");
 
 	function print_cell($str) {
 		if ($str == '')
@@ -55,16 +56,16 @@
 <hr></hr>
 <p></p>
 <?php
-	$limit=abs(isset($limit)?$limit:20);
-	$offset=abs(isset($offset)?$offset:0);
+	$limit=abs(isset($_REQUEST['limit'])?$_REQUEST['limit']:20);
+	$offset=abs(isset($_REQUEST['offset'])?$_REQUEST['offset']:0);
 	$lr=mysql_query("select count(*) as n from log where serno=$serno");
 	$lrow=mysql_fetch_array($lr);
 	if($lrow['n']>$limit){
 		$preoffset=max(0,$offset-$limit);
 		$postoffset=$offset+$limit;
 		echo "<table width=\"100%\">\n<tr align=center>\n";
-		printf("<td><%sa href=\"%s?serno=$serno&offset=%d\"><img border=0 alt=\"&lt;\" src=\"/icons/left.gif\"></a></td>\n", $offset>0?"":"no", $PHP_SELF, $preoffset);
-		printf("<td><%sa href=\"%s?serno=$serno&offset=%d\"><img border=0 alt=\"&gt;\" src=\"/icons/right.gif\"></a></td>\n", $postoffset<$lrow['n']?"":"no", $PHP_SELF, $postoffset);
+		printf("<td><%sa href=\"%s?submit=Log&serno=$serno&offset=%d\"><img border=0 alt=\"&lt;\" src=\"/icons/left.gif\"></a></td>\n", $offset>0?"":"no", $PHP_SELF, $preoffset);
+		printf("<td><%sa href=\"%s?submit=Log&serno=$serno&offset=%d\"><img border=0 alt=\"&gt;\" src=\"/icons/right.gif\"></a></td>\n", $postoffset<$lrow['n']?"":"no", $PHP_SELF, $postoffset);
 		echo "</tr>\n</table>\n";
 	}
 	mysql_free_result($lr);
diff --git a/tools/bddb/browse.php b/tools/bddb/browse.php
index 0e94f7d22d2..675dfab749d 100644
--- a/tools/bddb/browse.php
+++ b/tools/bddb/browse.php
@@ -8,29 +8,31 @@
 
 	require("defs.php");
 
-	if (!isset($verbose))
-		$verbose = 0;
+	$serno=isset($_REQUEST['serno'])?$_REQUEST['serno']:'';
 
-	if (!isset($serno))
-		$serno = 0;
+	$verbose=isset($_REQUEST['verbose'])?intval($_REQUEST['verbose']):0;
 
 	pg_head("$bddb_label - Browse database" . ($verbose?" (verbose)":""));
 ?>
 <p></p>
 <?php
-	if ($serno == 0) {
-		$limit=abs(isset($limit)?$limit:20);
-		$offset=abs(isset($offset)?$offset:0);
+	$limit=isset($_REQUEST['limit'])?abs(intval($_REQUEST['limit'])):20;
+	$offset=isset($_REQUEST['offset'])?abs(intval($_REQUEST['offset'])):0;
+
+	if ($serno == '') {
+
 		$lr=mysql_query("select count(*) as n from boards");
 		$lrow=mysql_fetch_array($lr);
+
 		if($lrow['n']>$limit){
 			$preoffset=max(0,$offset-$limit);
 			$postoffset=$offset+$limit;
-			echo "<table width=\"100%\">\n<tr align=center>\n";
-			printf("<td><%sa href=\"%s?offset=%d\"><img border=0 alt=\"&lt;\" src=\"/icons/left.gif\"></a></td>\n", $offset>0?"":"no", $PHP_SELF, $preoffset);
-			printf("<td><%sa href=\"%s?offset=%d\"><img border=0 alt=\"&gt;\" src=\"/icons/right.gif\"></a></td>\n", $postoffset<$lrow['n']?"":"no", $PHP_SELF, $postoffset);
+			echo "<table width=\"100%\">\n<tr>\n";
+			printf("<td align=left><%sa href=\"%s?submit=Browse&offset=%d&verbose=%d\"><img border=0 alt=\"&lt;\" src=\"/icons/left.gif\"></a></td>\n", $offset>0?"":"no", $PHP_SELF, $preoffset, $verbose);
+			printf("<td align=right><%sa href=\"%s?submit=Browse&offset=%d&verbose=%d\"><img border=0 alt=\"&gt;\" src=\"/icons/right.gif\"></a></td>\n", $postoffset<$lrow['n']?"":"no", $PHP_SELF, $postoffset, $offset);
 			echo "</tr>\n</table>\n";
 		}
+
 		mysql_free_result($lr);
 	}
 ?>
@@ -65,10 +67,28 @@
 ?>
 </tr>
 <?php
-	if ($serno == 0)
-		$r=mysql_query("select * from boards order by serno limit $offset,$limit");
-	else
-		$r=mysql_query("select * from boards where serno=$serno");
+	$query = "select * from boards";
+	if ($serno != '') {
+		$pre = " where ";
+		foreach (preg_split("/[\s,]+/", $serno) as $s) {
+			if (preg_match('/^[0-9]+$/',$s))
+				$query .= $pre . "serno=" . $s;
+			else if (preg_match('/^([0-9]+)-([0-9]+)$/',$s,$m)) {
+				$m1 = intval($m[1]); $m2 = intval($m[2]);
+				if ($m2 <= $m1)
+					die("bad serial number range ($s)");
+				$query .= $pre . "(serno>=$m[1] and serno<=$m[2])";
+			}
+			else
+				die("illegal serial number ($s)");
+			$pre = " or ";
+		}
+	}
+	$query .= " order by serno";
+	if ($serno == '')
+		$query .= " limit $offset,$limit";
+
+	$r = mysql_query($query);
 
 	function print_cell($str) {
 		if ($str == '')
@@ -117,10 +137,7 @@
 <table width="100%">
 <tr>
   <td align=center><?php
-	if ($verbose)
-		echo "<a href=\"browse.php?verbose=0\">Terse Listing</a>";
-	else
-		echo "<a href=\"browse.php?verbose=1\">Verbose Listing</a>";
+	printf("<a href=\"%s?submit=Browse&offset=%d&verbose=%d%s\">%s Listing</a>\n", $PHP_SELF, $offset, $verbose?0:1, $serno!=''?"&serno=$serno":'', $verbose?"Terse":"Verbose");
   ?></td>
   <td align=center><a href="index.php">Back to Start</a></td>
 </tr>
diff --git a/tools/bddb/create_tables.sql b/tools/bddb/create_tables.sql
index 4c25dd138e1..a2a578867fd 100644
--- a/tools/bddb/create_tables.sql
+++ b/tools/bddb/create_tables.sql
@@ -22,38 +22,38 @@ CREATE TABLE boards (
    rev tinyint(3) unsigned zerofill NOT NULL,
    location char(64),
    comments text,
-   sdram0 enum('32M','64M','128M','256M'),
-   sdram1 enum('32M','64M','128M','256M'),
-   sdram2 enum('32M','64M','128M','256M'),
-   sdram3 enum('32M','64M','128M','256M'),
-   flash0 enum('4M','8M','16M','32M','64M'),
-   flash1 enum('4M','8M','16M','32M','64M'),
-   flash2 enum('4M','8M','16M','32M','64M'),
-   flash3 enum('4M','8M','16M','32M','64M'),
-   zbt0 enum('512K','1M','2M','4M'),
-   zbt1 enum('512K','1M','2M','4M'),
-   zbt2 enum('512K','1M','2M','4M'),
-   zbt3 enum('512K','1M','2M','4M'),
-   zbt4 enum('512K','1M','2M','4M'),
-   zbt5 enum('512K','1M','2M','4M'),
-   zbt6 enum('512K','1M','2M','4M'),
-   zbt7 enum('512K','1M','2M','4M'),
-   zbt8 enum('512K','1M','2M','4M'),
-   zbt9 enum('512K','1M','2M','4M'),
-   zbta enum('512K','1M','2M','4M'),
-   zbtb enum('512K','1M','2M','4M'),
-   zbtc enum('512K','1M','2M','4M'),
-   zbtd enum('512K','1M','2M','4M'),
-   zbte enum('512K','1M','2M','4M'),
-   zbtf enum('512K','1M','2M','4M'),
-   xlxtyp0 enum('XCV300E','XCV400E','XCV600E'),
-   xlxtyp1 enum('XCV300E','XCV400E','XCV600E'),
-   xlxtyp2 enum('XCV300E','XCV400E','XCV600E'),
-   xlxtyp3 enum('XCV300E','XCV400E','XCV600E'),
-   xlxspd0 enum('6','7','8'),
-   xlxspd1 enum('6','7','8'),
-   xlxspd2 enum('6','7','8'),
-   xlxspd3 enum('6','7','8'),
+   sdram0 enum('32M','64M','128M','256M','512M','1G','2G','4G'),
+   sdram1 enum('32M','64M','128M','256M','512M','1G','2G','4G'),
+   sdram2 enum('32M','64M','128M','256M','512M','1G','2G','4G'),
+   sdram3 enum('32M','64M','128M','256M','512M','1G','2G','4G'),
+   flash0 enum('4M','8M','16M','32M','64M','128M','256M','512M','1G'),
+   flash1 enum('4M','8M','16M','32M','64M','128M','256M','512M','1G'),
+   flash2 enum('4M','8M','16M','32M','64M','128M','256M','512M','1G'),
+   flash3 enum('4M','8M','16M','32M','64M','128M','256M','512M','1G'),
+   zbt0 enum('512K','1M','2M','4M','8M','16M'),
+   zbt1 enum('512K','1M','2M','4M','8M','16M'),
+   zbt2 enum('512K','1M','2M','4M','8M','16M'),
+   zbt3 enum('512K','1M','2M','4M','8M','16M'),
+   zbt4 enum('512K','1M','2M','4M','8M','16M'),
+   zbt5 enum('512K','1M','2M','4M','8M','16M'),
+   zbt6 enum('512K','1M','2M','4M','8M','16M'),
+   zbt7 enum('512K','1M','2M','4M','8M','16M'),
+   zbt8 enum('512K','1M','2M','4M','8M','16M'),
+   zbt9 enum('512K','1M','2M','4M','8M','16M'),
+   zbta enum('512K','1M','2M','4M','8M','16M'),
+   zbtb enum('512K','1M','2M','4M','8M','16M'),
+   zbtc enum('512K','1M','2M','4M','8M','16M'),
+   zbtd enum('512K','1M','2M','4M','8M','16M'),
+   zbte enum('512K','1M','2M','4M','8M','16M'),
+   zbtf enum('512K','1M','2M','4M','8M','16M'),
+   xlxtyp0 enum('XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000','XC2VP2','XC2VP4','XC2VP7','XC2VP20','XC2VP30','XC2VP50','XC4VFX20','XC4VFX40','XC4VFX60','XC4VFX100','XC4VFX140'),
+   xlxtyp1 enum('XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000','XC2VP2','XC2VP4','XC2VP7','XC2VP20','XC2VP30','XC2VP50','XC4VFX20','XC4VFX40','XC4VFX60','XC4VFX100','XC4VFX140'),
+   xlxtyp2 enum('XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000','XC2VP2','XC2VP4','XC2VP7','XC2VP20','XC2VP30','XC2VP50','XC4VFX20','XC4VFX40','XC4VFX60','XC4VFX100','XC4VFX140'),
+   xlxtyp3 enum('XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000','XC2VP2','XC2VP4','XC2VP7','XC2VP20','XC2VP30','XC2VP50','XC4VFX20','XC4VFX40','XC4VFX60','XC4VFX100','XC4VFX140'),
+   xlxspd0 enum('6','7','8','4','5','9','10','11','12'),
+   xlxspd1 enum('6','7','8','4','5','9','10','11','12'),
+   xlxspd2 enum('6','7','8','4','5','9','10','11','12'),
+   xlxspd3 enum('6','7','8','4','5','9','10','11','12'),
    xlxtmp0 enum('COM','IND'),
    xlxtmp1 enum('COM','IND'),
    xlxtmp2 enum('COM','IND'),
@@ -62,13 +62,13 @@ CREATE TABLE boards (
    xlxgrd1 enum('NORMAL','ENGSAMP'),
    xlxgrd2 enum('NORMAL','ENGSAMP'),
    xlxgrd3 enum('NORMAL','ENGSAMP'),
-   cputyp enum('MPC8260'),
-   cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ'),
-   cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ'),
-   busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ'),
-   hstype enum('AMCC-S2064A'),
-   hschin enum('0','1','2','3','4'),
-   hschout enum('0','1','2','3','4'),
+   cputyp enum('MPC8260(HIP3)','MPC8260A(HIP4)','MPC8280(HIP7)','MPC8560'),
+   cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ','300MHZ','333MHZ','366MHZ','400MHZ','433MHZ','466MHZ','500MHZ','533MHZ','566MHZ','600MHZ','633MHZ','666MHZ','700MHZ','733MHZ','766MHZ','800MHZ','833MHZ','866MHZ','900MHZ','933MHZ','966MHZ','1000MHZ','1033MHZ','1066MHZ','1100MHZ','1133MHZ','1166MHZ','1200MHZ','1233MHZ','1266MHZ','1300MHZ','1333MHZ'),
+   cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ','300MHZ','333MHZ','366MHZ','400MHZ','433MHZ','466MHZ','500MHZ','533MHZ','566MHZ','600MHZ','633MHZ','666MHZ','700MHZ','733MHZ','766MHZ','800MHZ','833MHZ','866MHZ','900MHZ','933MHZ','966MHZ','1000MHZ','1033MHZ','1066MHZ','1100MHZ','1133MHZ','1166MHZ','1200MHZ','1233MHZ','1266MHZ','1300MHZ','1333MHZ'),
+   busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ','300MHZ','333MHZ','366MHZ','400MHZ','433MHZ','466MHZ','500MHZ','533MHZ','566MHZ','600MHZ','633MHZ','666MHZ','700MHZ','733MHZ','766MHZ','800MHZ','833MHZ','866MHZ','900MHZ','933MHZ','966MHZ','1000MHZ','1033MHZ','1066MHZ','1100MHZ','1133MHZ','1166MHZ','1200MHZ','1233MHZ','1266MHZ','1300MHZ','1333MHZ'),
+   hstype enum('AMCC-S2064A','Xilinx-Rockets'),
+   hschin enum('0','1','2','3','4','5','6','7','8','9','10','11','12','13','14','15','16'),
+   hschout enum('0','1','2','3','4','5','6','7','8','9','10','11','12','13','14','15','16'),
    PRIMARY KEY (serno),
    KEY serno (serno),
    UNIQUE serno_2 (serno)
diff --git a/tools/bddb/defs.php b/tools/bddb/defs.php
index be8a3b97d73..b7518e3f797 100644
--- a/tools/bddb/defs.php
+++ b/tools/bddb/defs.php
@@ -7,7 +7,7 @@
 	// contains mysql user id and password - keep secret
 	require("config.php");
 
-	if (isset($logout)) {
+	if (isset($_REQUEST['logout'])) {
 		Header("status: 401 Unauthorized");
 		Header("HTTP/1.0 401 Unauthorized");
 		Header("WWW-authenticate: basic realm=\"$bddb_label\"");
@@ -45,32 +45,40 @@
 	// board type
 	$type_vals = array('IO','CLP','DSP','INPUT','ALT-INPUT','DISPLAY');
 
-	// sdram sizes (nbits array is for write into eeprom config file)
-	$sdram_vals = array('','32M','64M','128M','256M');
-	$sdram_nbits = array(0,25,26,27,28);
+	// Xilinx fpga types
+	$xlxtyp_vals = array('','XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000','XC2VP2','XC2VP4','XC2VP7','XC2VP20','XC2VP30','XC2VP50','XC4VFX20','XC4VFX40','XC4VFX60','XC4VFX100','XC4VFX140');
 
-	// flash sizes (nbits array is for write into eeprom config file)
-	$flash_vals = array('','4M','8M','16M','32M','64M');
-	$flash_nbits = array(0,22,23,24,25,26);
+	// Xilinx fpga speeds
+	$xlxspd_vals = array('','6','7','8','4','5','9','10','11','12');
 
-	// zbt ram sizes (nbits array is for write into eeprom config file)
-	$zbt_vals = array('','512K','1M','2M','4M');
-	$zbt_nbits = array(0,19,20,21,22);
-
-	// Xilinx attributes
-	$xlxtyp_vals = array('','XCV300E','XCV400E','XCV600E','XC2V2000','XC2V3000','XC2V4000','XC2V6000');
-	$xlxspd_vals = array('','6','7','8','4','5');
+	// Xilinx fpga temperatures (commercial or industrial)
 	$xlxtmp_vals = array('','COM','IND');
+
+	// Xilinx fpga grades (normal or engineering sample)
 	$xlxgrd_vals = array('','NORMAL','ENGSAMP');
 
-	// processor attributes
-	$cputyp_vals = array('','MPC8260');
-	$clk_vals = array('','33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ');
+	// CPU types
+	$cputyp_vals = array('','MPC8260(HIP3)','MPC8260A(HIP4)','MPC8280(HIP7)','MPC8560');
+
+	// CPU/BUS/CPM clock speeds 
+	$clk_vals = array('','33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ','300MHZ','333MHZ','366MHZ','400MHZ','433MHZ','466MHZ','500MHZ','533MHZ','566MHZ','600MHZ','633MHZ','666MHZ','700MHZ','733MHZ','766MHZ','800MHZ','833MHZ','866MHZ','900MHZ','933MHZ','966MHZ','1000MHZ','1033MHZ','1066MHZ','1100MHZ','1133MHZ','1166MHZ','1200MHZ','1233MHZ','1266MHZ','1300MHZ','1333MHZ');
+
+	// sdram sizes (nbits array is for eeprom config file)
+	$sdram_vals = array('','32M','64M','128M','256M','512M','1G','2G','4G');
+	$sdram_nbits = array(0,25,26,27,28,29,30,31,32);
+
+	// flash sizes (nbits array is for eeprom config file)
+	$flash_vals = array('','4M','8M','16M','32M','64M','128M','256M','512M','1G');
+	$flash_nbits = array(0,22,23,24,25,26,27,28,29,30);
+
+	// zbt ram sizes (nbits array is for write into eeprom config file)
+	$zbt_vals = array('','512K','1M','2M','4M','8M','16M');
+	$zbt_nbits = array(0,19,20,21,22,23,24);
 
 	// high-speed serial attributes
-	$hstype_vals = array('','AMCC-S2064A');
-	$hschin_vals = array('0','1','2','3','4');
-	$hschout_vals = array('0','1','2','3','4');
+	$hstype_vals = array('','AMCC-S2064A','Xilinx-Rockets');
+	$hschin_vals = array('0','1','2','3','4','5','6','7','8','9','10','11','12','13','14','15','16');
+	$hschout_vals = array('0','1','2','3','4','5','6','7','8','9','10','11','12','13','14','15','16');
 
 	// value filters - used when outputting html
 	function rev_filter($num) {
@@ -310,6 +318,38 @@
 		end_field();
 	}
 
+	// print a mysql ENUM as an html SELECT INPUT
+	function print_enum_select($name, $array, $vals, $def = -1) {
+
+		begin_field($name);
+
+		echo "\t\t<select name=$name>\n";
+
+		if (key_in_array($name, $array))
+			$chk = array_search($array[$name], $vals, FALSE);
+		else
+			$chk = $def;
+
+		$nval = count($vals);
+
+		for ($i = 0; $i < $nval; $i++) {
+
+			$val = $vals[$i];
+			if ($val == '')
+				$pval = "none";
+			else
+				$pval = "$val";
+
+			printf("\t\t\t<option " .
+				"value=\"%s\"%s>%s</option>\n",
+				$val, $i == $chk ? " selected" : "", $pval);
+		}
+
+		echo "\t\t</select>\n";
+
+		end_field();
+	}
+
 	// print a group of mysql ENUMs (e.g. name0,name1,...) as an html SELECT
 	function print_enum_multi($base, $array, $vals, $cnt, $defs, $grp = 0) {
 
@@ -375,9 +415,9 @@
 
 			$name = sprintf("%s%x", $base, $i);
 
-			if (isset($GLOBALS[$name])) {
+			if (isset($_REQUEST[$name])) {
 				$retval .= sprintf(", %s='%s'",
-					$name, $GLOBALS[$name]);
+					$name, $_REQUEST[$name]);
 			}
 		}
 
@@ -437,7 +477,7 @@
 
 			$name = sprintf("%s%x", $base, $i);
 
-			if (isset($GLOBALS[$name]))
+			if (isset($_REQUEST[$name]))
 				$retval++;
 		}
 
@@ -458,13 +498,14 @@
 
 	function gen_eth_addr($serno) {
 
-		$ethaddr_high = (mt_rand(0, 65535) & 0xfeff) | 0x0200;
-		$ethaddr_low = mt_rand(0, 4294967295);
+		$ethaddr_hgh = (mt_rand(0, 65535) & 0xfeff) | 0x0200;
+		$ethaddr_mid = mt_rand(0, 65535);
+		$ethaddr_low = mt_rand(0, 65535);
 
 		return sprintf("%02lx:%02lx:%02lx:%02lx:%02lx:%02lx",
-			$ethaddr_high >> 8, $ethaddr_high & 0xff,
-			$ethaddr_low >> 24, ($ethaddr_low >> 16) & 0xff,
-			($ethaddr_low >> 8) & 0xff, $ethaddr_low & 0xff);
+			$ethaddr_hgh >> 8, $ethaddr_hgh & 0xff,
+			$ethaddr_mid >> 8, $ethaddr_mid & 0xff,
+			$ethaddr_low >> 8, $ethaddr_low & 0xff);
 	}
 
 	// check that an ethernet address is valid
diff --git a/tools/bddb/dodelete.php b/tools/bddb/dodelete.php
index f1567d2d891..4839e36e60e 100644
--- a/tools/bddb/dodelete.php
+++ b/tools/bddb/dodelete.php
@@ -10,8 +10,9 @@
 
 	pg_head("$bddb_label - Delete Board Results");
 
-	if (!($serno=intval($serno)))
+	if (!isset($_REQUEST['serno']))
 		die("the board serial number was not specified");
+	$serno=intval($_REQUEST['serno']);
 
 	mysql_query("delete from boards where serno=$serno");
 
diff --git a/tools/bddb/dodellog.php b/tools/bddb/dodellog.php
index 5942ec9a520..9dd78c11b6d 100644
--- a/tools/bddb/dodellog.php
+++ b/tools/bddb/dodellog.php
@@ -10,11 +10,13 @@
 
 	pg_head("$bddb_label - Delete Log Entry Results");
 
-	if (!($serno=intval($serno)))
+	if (!isset($_REQUEST['serno']))
 		die("the board serial number was not specified");
+	$serno=intval($_REQUEST['serno']);
 
-	if (!isset($logno) || $logno == 0)
+	if (!isset($_REQUEST['logno']) || $_REQUEST['logno'] == 0)
 		die("the log entry number not specified!");
+	$logno=$_REQUEST['logno'];
 
 	mysql_query("delete from log where serno=$serno and logno=$logno");
 
diff --git a/tools/bddb/doedit.php b/tools/bddb/doedit.php
index a46ea10cb68..13fbb694790 100644
--- a/tools/bddb/doedit.php
+++ b/tools/bddb/doedit.php
@@ -10,18 +10,21 @@
 
 	pg_head("$bddb_label - Edit Board Results");
 
-	if ($serno == 0)
+	if (!isset($_REQUEST['serno']) || $_REQUEST['serno'] == '')
 		die("the board serial number was not specified");
+	$serno=intval($_REQUEST['serno']);
 
 	$query="update boards set";
 
-	if (isset($ethaddr)) {
+	if (isset($_REQUEST['ethaddr'])) {
+		$ethaddr=$_REQUEST['ethaddr'];
 		if (!eth_addr_is_valid($ethaddr))
 			die("ethaddr is invalid ('$ethaddr')");
 		$query.=" ethaddr='$ethaddr',";
 	}
 
-	if (isset($date)) {
+	if (isset($_REQUEST['date'])) {
+		$date=$_REQUEST['date'];
 		list($y, $m, $d) = split("-", $date);
 		if (!checkdate($m, $d, $y) || $y < 1999)
 			die("date is invalid (input '$date', " .
@@ -29,31 +32,36 @@
 		$query.=" date='$date'";
 	}
 
-	if (isset($batch)) {
+	if (isset($_REQUEST['batch'])) {
+		$batch=$_REQUEST['batch'];
 		if (strlen($batch) > 32)
 			die("batch field too long (>32)");
 		$query.=", batch='$batch'";
 	}
 
-	if (isset($type)) {
+	if (isset($_REQUEST['type'])) {
+		$type=$_REQUEST['type'];
 		if (!in_array($type, $type_vals))
 			die("Invalid type ($type) specified");
 		$query.=", type='$type'";
 	}
 
-	if (isset($rev)) {
+	if (isset($_REQUEST['rev'])) {
+		$rev=$_REQUEST['rev'];
 		if (($rev = intval($rev)) <= 0 || $rev > 255)
 			die("Revision number is invalid ($rev)");
 		$query.=sprintf(", rev=%d", $rev);
 	}
 
-	if (isset($location)) {
+	if (isset($_REQUEST['location'])) {
+		$location=$_REQUEST['location'];
 		if (strlen($location) > 64)
 			die("location field too long (>64)");
 		$query.=", location='$location'";
 	}
 
-	if (isset($comments))
+	if (isset($_REQUEST['comments']))
+		$comments=$_REQUEST['comments'];
 		$query.=", comments='" . rawurlencode($comments) . "'";
 
 	$query.=gather_enum_multi_query("sdram", 4);
@@ -77,46 +85,54 @@
 	if (count_enum_multi("xlxgrd", 4) != $nxlx)
 		die("number of xilinx grades not same as number of types");
 
-	if (isset($cputyp)) {
+	if (isset($_REQUEST['cputyp'])) {
+		$cputyp=$_REQUEST['cputyp'];
 		$query.=", cputyp='$cputyp'";
-		if ($cpuspd == '')
+		if (!isset($_REQUEST['cpuspd']) || $_REQUEST['cpuspd'] == '')
 			die("must specify cpu speed if cpu type is defined");
+		$cpuspd=$_REQUEST['cpuspd'];
 		$query.=", cpuspd='$cpuspd'";
-		if ($cpmspd == '')
+		if (!isset($_REQUEST['cpmspd']) || $_REQUEST['cpmspd'] == '')
 			die("must specify cpm speed if cpu type is defined");
+		$cpmspd=$_REQUEST['cpmspd'];
 		$query.=", cpmspd='$cpmspd'";
-		if ($busspd == '')
+		if (!isset($_REQUEST['busspd']) || $_REQUEST['busspd'] == '')
 			die("must specify bus speed if cpu type is defined");
+		$busspd=$_REQUEST['busspd'];
 		$query.=", busspd='$busspd'";
 	}
 	else {
-		if (isset($cpuspd))
+		if (isset($_REQUEST['cpuspd']))
 			die("can't specify cpu speed if there is no cpu");
-		if (isset($cpmspd))
+		if (isset($_REQUEST['cpmspd']))
 			die("can't specify cpm speed if there is no cpu");
-		if (isset($busspd))
+		if (isset($_REQUEST['busspd']))
 			die("can't specify bus speed if there is no cpu");
 	}
 
-	if (isset($hschin)) {
+	if (isset($_REQUEST['hschin'])) {
+		$hschin=$_REQUEST['hschin'];
 		if (($hschin = intval($hschin)) < 0 || $hschin > 4)
 			die("Invalid number of hs input chans ($hschin)");
 	}
 	else
 		$hschin = 0;
-	if (isset($hschout)) {
+	if (isset($_REQUEST['hschout'])) {
+		$hschout=$_REQUEST['hschout'];
 		if (($hschout = intval($hschout)) < 0 || $hschout > 4)
 			die("Invalid number of hs output chans ($hschout)");
 	}
 	else
 		$hschout = 0;
-	if (isset($hstype))
+	if (isset($_REQUEST['hstype'])) {
+		$hstype=$_REQUEST['hstype'];
 		$query.=", hstype='$hstype'";
+	}
 	else {
-		if ($hschin != 0)
+		if ($_REQUEST['hschin'] != 0)
 			die("number of high-speed input channels must be zero"
 				. " if high-speed chip is not present");
-		if ($hschout != 0)
+		if ($_REQUEST['hschout'] != 0)
 			die("number of high-speed output channels must be zero"
 				. " if high-speed chip is not present");
 	}
diff --git a/tools/bddb/doedlog.php b/tools/bddb/doedlog.php
index 21e50b0e189..7009aa7dad1 100644
--- a/tools/bddb/doedlog.php
+++ b/tools/bddb/doedlog.php
@@ -10,15 +10,18 @@
 
 	pg_head("$bddb_label - Edit Log Entry Results");
 
-	if ($serno == 0)
+	if (!isset($_REQUEST['serno']) || $_REQUEST['serno'] == '')
 		die("the board serial number was not specified");
+	$serno=intval($_REQUEST['serno']);
 
-	if (!isset($logno) || $logno == 0)
+	if (!isset($_REQUEST['logno']) || $_REQUEST['logno'] == '')
 		die("log number not specified!");
+	$logno=intval($_REQUEST['logno']);
 
 	$query="update log set";
 
-	if (isset($date)) {
+	if (isset($_REQUEST['date'])) {
+		$date=$_REQUEST['date'];
 		list($y, $m, $d) = split("-", $date);
 		if (!checkdate($m, $d, $y) || $y < 1999)
 			die("date is invalid (input '$date', " .
@@ -26,11 +29,15 @@
 		$query.=" date='$date'";
 	}
 
-	if (isset($who))
+	if (isset($_REQUEST['who'])) {
+		$who=$_REQUEST['who'];
 		$query.=", who='" . $who . "'";
+	}
 
-	if (isset($details))
+	if (isset($_REQUEST['details'])) {
+		$details=$_REQUEST['details'];
 		$query.=", details='" . rawurlencode($details) . "'";
+	}
 
 	$query.=" where serno=$serno and logno=$logno";
 
diff --git a/tools/bddb/donew.php b/tools/bddb/donew.php
index b1288d68a35..39b2c78fcae 100644
--- a/tools/bddb/donew.php
+++ b/tools/bddb/donew.php
@@ -10,8 +10,10 @@
 
 	pg_head("$bddb_label - Board Registration Results");
 
-	if (($serno=intval($serno)) != 0)
+	if (isset($_REQUEST['serno'])) {
+		$serno=$_REQUEST['serno'];
 		die("serial number must not be set ($serno) when Creating!");
+	}
 
 	$query="update boards set";
 
diff --git a/tools/bddb/donewlog.php b/tools/bddb/donewlog.php
index c3b960650f2..7635d2992d9 100644
--- a/tools/bddb/donewlog.php
+++ b/tools/bddb/donewlog.php
@@ -10,11 +10,14 @@
 
 	pg_head("$bddb_label - Add Log Entry Results");
 
-	if ($serno == 0)
+	if (!isset($_REQUEST['serno']) || $_REQUEST['serno'] == '')
 		die("serial number not specified!");
+	$serno=intval($_REQUEST['serno']);
 
-	if (isset($logno))
+	if (isset($_REQUEST['logno'])) {
+		$logno=$_REQUEST['logno'];
 		die("log number must not be set ($logno) when Creating!");
+	}
 
 	$query="update log set serno=$serno";
 
@@ -23,11 +26,15 @@
 		die("date is invalid (input '$date', yyyy-mm-dd '$y-$m-$d')");
 	$query.=", date='$date'";
 
-	if (isset($who))
+	if (isset($_REQUEST['who'])) {
+		$who=$_REQUEST['who'];
 		$query.=", who='" . $who . "'";
+	}
 
-	if (isset($details))
+	if (isset($_REQUEST['details'])) {
+		$details=$_REQUEST['details'];
 		$query.=", details='" . rawurlencode($details) . "'";
+	}
 
 	// echo "final query = '$query'<br>\n";
 
diff --git a/tools/bddb/edit.php b/tools/bddb/edit.php
index 155e848659f..dd8c26c5cd3 100644
--- a/tools/bddb/edit.php
+++ b/tools/bddb/edit.php
@@ -11,7 +11,7 @@
 	pg_head("$bddb_label - Edit Board Registration");
 
 	if ($serno == 0)
-		die("serial number not specified!");
+		die("serial number not specified or invalid!");
 
 	$pserno = sprintf("%010d", $serno);
 
@@ -73,17 +73,17 @@
 	// xlxgrd[0-3] enum('NORMAL','ENGSAMP')
 	print_enum_multi("xlxgrd", $row, $xlxgrd_vals, 4, array(), 1);
 
-	// cputyp enum('MPC8260')
+	// cputyp enum('MPC8260(HIP3)','MPC8260A(HIP4)','MPC8280(HIP7)')
 	print_enum("cputyp", $row, $cputyp_vals);
 
-	// cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("cpuspd", $row, $clk_vals);
+	// cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("cpuspd", $row, $clk_vals);
 
-	// cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("cpmspd", $row, $clk_vals);
+	// cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("cpmspd", $row, $clk_vals);
 
-	// busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("busspd", $row, $clk_vals);
+	// busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("busspd", $row, $clk_vals);
 
 	// hstype enum('AMCC-S2064A')
 	print_enum("hstype", $row, $hstype_vals);
diff --git a/tools/bddb/edlog.php b/tools/bddb/edlog.php
index 375dca32405..8befd35b924 100644
--- a/tools/bddb/edlog.php
+++ b/tools/bddb/edlog.php
@@ -10,11 +10,13 @@
 
 	pg_head("$bddb_label - Edit Board Log Entry");
 
-	if ($serno == 0)
+	if (!isset($_REQUEST['serno']) || $_REQUEST['serno'] == '')
 		die("serial number not specified!");
+	$serno=intval($_REQUEST['serno']);
 
-	if (!isset($logno) || $logno == 0)
+	if (!isset($_REQUEST['logno']) || $_REQUEST['logno'] == '')
 		die("log number not specified!");
+	$logno=intval($_REQUEST['logno']);
 
 	$pserno = sprintf("%010d", $serno);
 	$plogno = sprintf("%010d", $logno);
diff --git a/tools/bddb/execute.php b/tools/bddb/execute.php
index 4cc87c7a4d1..0b62882d751 100644
--- a/tools/bddb/execute.php
+++ b/tools/bddb/execute.php
@@ -4,13 +4,9 @@
 	// Murray Jensen <Murray.Jensen@csiro.au>
 	// CSIRO Manufacturing Science and Technology, Preston Lab
 
-	if (!isset($serno))
-		$serno = 0;
-	else
-		$serno = intval($serno);
+	$serno=isset($_REQUEST['serno'])?$_REQUEST['serno']:'';
 
-	if (!isset($submit))
-		$submit = "[NOT SET]";
+	$submit=isset($_REQUEST['submit'])?$_REQUEST['submit']:"[NOT SET]";
 
 	switch ($submit) {
 
diff --git a/tools/bddb/new.php b/tools/bddb/new.php
index 618194cea1f..30323ff8192 100644
--- a/tools/bddb/new.php
+++ b/tools/bddb/new.php
@@ -13,6 +13,7 @@
 <form action=donew.php method=POST>
 <p></p>
 <?php
+	$serno=intval($serno);
 	// if a serial number was supplied, fetch the record
 	// and use its contents as defaults
 	if ($serno != 0) {
@@ -23,8 +24,6 @@
 	else
 		$row = array();
 
-	echo "<input type=hidden name=serno value=0>\n";
-
 	begin_table(5);
 
 	// date date
@@ -60,17 +59,17 @@
 	// xlxgrd[0-3] enum('NORMAL','ENGSAMP')
 	print_enum_multi("xlxgrd", $row, $xlxgrd_vals, 4, array(1), 1);
 
-	// cputyp enum('MPC8260')
+	// cputyp enum('MPC8260(HIP3)','MPC8260A(HIP4)','MPC8280(HIP7)')
 	print_enum("cputyp", $row, $cputyp_vals, 1);
 
-	// cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("cpuspd", $row, $clk_vals, 4);
+	// cpuspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("cpuspd", $row, $clk_vals, 4);
 
-	// cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("cpmspd", $row, $clk_vals, 4);
+	// cpmspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("cpmspd", $row, $clk_vals, 4);
 
-	// busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ')
-	print_enum("busspd", $row, $clk_vals, 2);
+	// busspd enum('33MHZ','66MHZ','100MHZ','133MHZ','166MHZ','200MHZ','233MHZ','266MHZ')
+	print_enum_select("busspd", $row, $clk_vals, 2);
 
 	// hstype enum('AMCC-S2064A')
 	print_enum("hstype", $row, $hstype_vals, 1);
diff --git a/tools/bddb/newlog.php b/tools/bddb/newlog.php
index 70f62ff49d9..609bb855c5a 100644
--- a/tools/bddb/newlog.php
+++ b/tools/bddb/newlog.php
@@ -10,11 +10,14 @@
 
 	pg_head("$bddb_label - New Log Entry");
 
-	if ($serno == 0)
-		die("serial number not specified!");
-
-	if (isset($logno))
-		die("log number must not be specified when adding!");
+	if (!isset($_REQUEST['serno']) || $_REQUEST['serno'] == '')
+		die("serial number not specified or invalid!");
+	$serno=intval($_REQUEST['serno']);
+
+	if (isset($_REQUEST['logno'])) {
+		$logno=$_REQUEST['logno'];
+		die("log number must not be specified when adding! ($logno)");
+	}
 ?>
 <form action=donewlog.php method=POST>
 <p></p>
@@ -27,7 +30,7 @@
 	print_field("date", array('date' => date("Y-m-d")));
 
 	// who char(20)
-	print_field("who", "");
+	print_field("who", array());
 
 	// details text
 	print_field_multiline("details", array(), 60, 10, 'text_filter');
-- 
cgit v1.3.1

